b.com/redmine/redmine</title>
<meta name='generator' content='cgit v1.2.3'/>
<meta name='robots' content='index, nofollow'/>
<link rel='stylesheet' type='text/css' href='/cgit.css'/>
<link rel='shortcut icon' href='/favicon.ico'/>
<link rel='alternate' title='Atom feed' href='https://source.dussan.org/redmine.git/atom/app/views/wiki/new.js.erb?h=master' type='application/atom+xml'/>
</head>
<body>
<div id='cgit'><table id='header'>
<tr>
<td class='logo' rowspan='2'><a href='/'><img src='/cgit.png' alt='cgit logo'/></a></td>
<td class='main'><a href='/'>index</a> : <a href='/redmine.git/'>redmine.git</a></td><td class='form'><form method='get'>
<input type='hidden' name='id' value='f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'/><select name='h' onchange='this.form.submit();'>
<option value='0.6-stable'>0.6-stable</option>
<option value='0.7-stable'>0.7-stable</option>
<option value='0.8-stable'>0.8-stable</option>
<option value='0.9-stable'>0.9-stable</option>
<option value='1.0-stable'>1.0-stable</option>
<option value='1.1-stable'>1.1-stable</option>
<option value='1.2-stable'>1.2-stable</option>
<option value='1.3-stable'>1.3-stable</option>
<option value='1.4-stable'>1.4-stable</option>
<option value='2.0-stable'>2.0-stable</option>
<option value='2.1-stable'>2.1-stable</option>
<option value='2.2-stable'>2.2-stable</option>
<option value='2.3-stable'>2.3-stable</option>
<option value='2.4-stable'>2.4-stable</option>
<option value='2.5-stable'>2.5-stable</option>
<option value='2.6-stable'>2.6-stable</option>
<option value='3.0-stable'>3.0-stable</option>
<option value='3.1-stable'>3.1-stable</option>
<option value='3.2-stable'>3.2-stable</option>
<option value='3.3-stable'>3.3-stable</option>
<option value='3.4-stable'>3.4-stable</option>
<option value='4.0-stable'>4.0-stable</option>
<option value='4.1-stable'>4.1-stable</option>
<option value='4.2-stable'>4.2-stable</option>
<option value='5.0-stable'>5.0-stable</option>
<option value='5.1-stable'>5.1-stable</option>
<option value='6.0-stable'>6.0-stable</option>
<option value='integration-to-svn-stable-1.0'>integration-to-svn-stable-1.0</option>
<option value='integration-to-svn-trunk'>integration-to-svn-trunk</option>
<option value='master' selected='selected'>master</option>
<option value='nbc'>nbc</option>
<option value='plugin-hooks'>plugin-hooks</option>
<option value='swistak'>swistak</option>
<option value='work'>work</option>
</select> <input type='submit' value='switch'/></form></td></tr>
<tr><td class='sub'>Mirror of redmine code source: https://github.com/redmine/redmine</td><td class='sub right'>www-data</td></tr></table>
<table class='tabs'><tr><td>
<a href='/redmine.git/'>summary</a><a href='/redmine.git/refs/?id=f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'>refs</a><a href='/redmine.git/log/app/views/wiki/new.js.erb'>log</a><a class='active' href='/redmine.git/tree/app/views/wiki/new.js.erb?id=f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'>tree</a><a href='/redmine.git/commit/app/views/wiki/new.js.erb?id=f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'>commit</a><a href='/redmine.git/diff/app/views/wiki/new.js.erb?id=f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'>diff</a><a href='/redmine.git/stats/app/views/wiki/new.js.erb'>stats</a></td><td class='form'><form class='right' method='get' action='/redmine.git/log/app/views/wiki/new.js.erb'>
<input type='hidden' name='id' value='f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'/><select name='qt'>
<option value='grep'>log msg</option>
<option value='author'>author</option>
<option value='committer'>committer</option>
<option value='range'>range</option>
</select>
<input class='txt' type='search' size='10' name='q' value=''/>
<input type='submit' value='search'/>
</form>
</td></tr></table>
<div class='path'>path: <a href='/redmine.git/tree/?id=f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'>root</a>/<a href='/redmine.git/tree/app?id=f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'>app</a>/<a href='/redmine.git/tree/app/views?id=f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'>views</a>/<a href='/redmine.git/tree/app/views/wiki?id=f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'>wiki</a>/<a href='/redmine.git/tree/app/views/wiki/new.js.erb?id=f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'>new.js.erb</a></div><div class='content'>blob: c12b3534003aaf1a2712618f23f8faf8291a02b2 (<a href='/redmine.git/plain/app/views/wiki/new.js.erb?id=f84ef7a6b4d27c025afcce47fc5bf10bbfd365af'>plain</a>)
<table summary='blob content' class='blob'>
<tr><td class='linenumbers'><pre><a id='n1' href='#n1'>1</a>
<a id='n2' href='#n2'>2</a>
</pre></td>
<td class='lines'><pre><code>