From 323c6ea29eb5c950f7ded974c9f824acc4d29b67 Mon Sep 17 00:00:00 2001
From: Ferdinand Thiessen <opensource@fthiessen.de>
Date: Tue, 21 May 2024 23:25:14 +0200
Subject: fix(files): Add proper visual loading feedback for image preview

Signed-off-by: Ferdinand Thiessen <opensource@fthiessen.de>
---
 apps/files/src/components/FilesListVirtual.vue | 6 ------
 1 file changed, 6 deletions(-)

(limited to 'apps/files/src/components/FilesListVirtual.vue')

diff --git a/apps/files/src/components/FilesListVirtual.vue b/apps/files/src/components/FilesListVirtual.vue
index 15311ccb90f..e38229e9d9a 100644
--- a/apps/files/src/components/FilesListVirtual.vue
+++ b/apps/files/src/components/FilesListVirtual.vue
@@ -550,12 +550,6 @@ export default defineComponent({
 				// Center and contain the preview
 				object-fit: contain;
 				object-position: center;
-
-				/* Preview not loaded animation effect */
-				&:not(.files-list__row-icon-preview--loaded) {
-					background: var(--color-loading-dark);
-					// animation: preview-gradient-fade 1.2s ease-in-out infinite;
-				}
 			}
 
 			&-favorite {
-- 
cgit v1.2.3

