From 73f3c0aef73dcb08d3e3ac8c6e0f670eb769a8d7 Mon Sep 17 00:00:00 2001
From: Julien Veyssier <julien-nc@posteo.net>
Date: Mon, 15 May 2023 12:08:26 +0200
Subject: adjust file custom picker component padding as the smart picker does
 not have padding anymore

Signed-off-by: Julien Veyssier <julien-nc@posteo.net>
---
 apps/files/src/views/FileReferencePickerElement.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'apps/files/src/views/FileReferencePickerElement.vue')

diff --git a/apps/files/src/views/FileReferencePickerElement.vue b/apps/files/src/views/FileReferencePickerElement.vue
index 543dba3350d..0aa6678f121 100644
--- a/apps/files/src/views/FileReferencePickerElement.vue
+++ b/apps/files/src/views/FileReferencePickerElement.vue
@@ -84,7 +84,7 @@ export default {
 <style scoped lang="scss">
 .reference-file-picker {
 	flex-grow: 1;
-	margin-top: 44px;
+	padding: 12px 16px 16px 16px;
 
 	&:deep(.oc-dialog) {
 		transform: none !important;
-- 
cgit v1.2.3

