From 40af51cc9bc4fc12ed19fb07800ba107046a74f1 Mon Sep 17 00:00:00 2001
From: Joas Schilling <coding@schilljs.com>
Date: Fri, 18 Sep 2020 14:06:01 +0200
Subject: Never copy the share link when the password is forced

Signed-off-by: Joas Schilling <coding@schilljs.com>
---
 apps/files_sharing/src/components/SharingEntryLink.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'apps/files_sharing/src/components/SharingEntryLink.vue')

diff --git a/apps/files_sharing/src/components/SharingEntryLink.vue b/apps/files_sharing/src/components/SharingEntryLink.vue
index 3ba4e59867e..880f0d8111a 100644
--- a/apps/files_sharing/src/components/SharingEntryLink.vue
+++ b/apps/files_sharing/src/components/SharingEntryLink.vue
@@ -708,7 +708,7 @@ export default {
 				// Execute the copy link method
 				// freshly created share component
 				// ! somehow does not works on firefox !
-				if (update || !this.config.enforcePasswordForPublicLink) {
+				if (!this.config.enforcePasswordForPublicLink) {
 					// Only copy the link when the password was not forced,
 					// otherwise the user needs to copy/paste the password before finishing the share.
 					component.copyLink()
-- 
cgit v1.2.3

