From 4399ed47122543b404fff82b2246b55544842e57 Mon Sep 17 00:00:00 2001
From: rakekniven <2069590+rakekniven@users.noreply.github.com>
Date: Sat, 21 May 2022 14:27:59 +0200
Subject: l10n: Fix escaping issue

At Transifex the string is cut and shown `For the server to work properly, it`

I modified this without vue knowledge. @CarlSchwan Can you check please?

Reported at Transifex.

Signed-off-by: rakekniven <2069590+rakekniven@users.noreply.github.com>
Signed-off-by: nextcloud-command <nextcloud-command@users.noreply.github.com>
---
 apps/settings/src/components/BasicSettings/BackgroundJob.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'apps/settings/src/components/BasicSettings/BackgroundJob.vue')

diff --git a/apps/settings/src/components/BasicSettings/BackgroundJob.vue b/apps/settings/src/components/BasicSettings/BackgroundJob.vue
index a785d585228..525e82b42b8 100644
--- a/apps/settings/src/components/BasicSettings/BackgroundJob.vue
+++ b/apps/settings/src/components/BasicSettings/BackgroundJob.vue
@@ -22,7 +22,7 @@
 
 <template>
 	<SettingsSection :title="t('settings', 'Background jobs')"
-		:description="t('settings', `For the server to work properly, it's important to configure background jobs correctly. Cron is the recommended setting. Please see the documentation for more information.`)"
+		:description="t('settings', 'For the server to work properly, it’s important to configure background jobs correctly. Cron is the recommended setting. Please see the documentation for more information.')"
 		:doc-url="backgroundJobsDocUrl">
 		<template v-if="lastCron !== 0">
 			<span v-if="oldExecution" class="error">
-- 
cgit v1.2.3

