From def9e25967dd4070ab3f8ac81fe2fc947489c643 Mon Sep 17 00:00:00 2001
From: Joas Schilling <coding@schilljs.com>
Date: Fri, 15 Jul 2022 09:12:10 +0200
Subject: Fix HTML validation of material design icons

Signed-off-by: Joas Schilling <coding@schilljs.com>
---
 .../components/PersonalInfo/ProfileSection/EditProfileAnchorLink.vue    | 2 --
 1 file changed, 2 deletions(-)

(limited to 'apps/settings/src/components/PersonalInfo/ProfileSection/EditProfileAnchorLink.vue')

diff --git a/apps/settings/src/components/PersonalInfo/ProfileSection/EditProfileAnchorLink.vue b/apps/settings/src/components/PersonalInfo/ProfileSection/EditProfileAnchorLink.vue
index 1ee3bc0e149..61a7bfc908d 100644
--- a/apps/settings/src/components/PersonalInfo/ProfileSection/EditProfileAnchorLink.vue
+++ b/apps/settings/src/components/PersonalInfo/ProfileSection/EditProfileAnchorLink.vue
@@ -25,8 +25,6 @@
 		href="#profile-visibility"
 		v-on="$listeners">
 		<ChevronDownIcon class="anchor-icon"
-			decorative
-			title=""
 			:size="22" />
 		{{ t('settings', 'Edit your Profile visibility') }}
 	</a>
-- 
cgit v1.2.3

