From c3c6de7bcb48659e2114d34f6d09f655a0306e44 Mon Sep 17 00:00:00 2001
From: Ferdinand Thiessen <opensource@fthiessen.de>
Date: Mon, 19 Feb 2024 22:17:39 +0100
Subject: fix(settings): Refactor logger code to use Typescript

Signed-off-by: Ferdinand Thiessen <opensource@fthiessen.de>
---
 apps/settings/src/components/WebAuthn/AddDevice.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'apps/settings/src/components/WebAuthn/AddDevice.vue')

diff --git a/apps/settings/src/components/WebAuthn/AddDevice.vue b/apps/settings/src/components/WebAuthn/AddDevice.vue
index f9b3223d8cb..b9e9d087a0b 100644
--- a/apps/settings/src/components/WebAuthn/AddDevice.vue
+++ b/apps/settings/src/components/WebAuthn/AddDevice.vue
@@ -65,7 +65,7 @@ import { confirmPassword } from '@nextcloud/password-confirmation'
 import NcButton from '@nextcloud/vue/dist/Components/NcButton.js'
 import '@nextcloud/password-confirmation/dist/style.css'
 
-import logger from '../../logger.js'
+import logger from '../../logger.ts'
 import {
 	startRegistration,
 	finishRegistration,
-- 
cgit v1.2.3

