From d1a81a0225c326c91ee2e09167055d6f98924560 Mon Sep 17 00:00:00 2001
From: Julius Härtl <jus@bitgrid.net>
Date: Thu, 9 Jan 2020 08:45:41 +0100
Subject: Fallback to proper default values
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Signed-off-by: Julius Härtl <jus@bitgrid.net>
---
 apps/workflowengine/src/components/Check.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'apps/workflowengine/src/components/Check.vue')

diff --git a/apps/workflowengine/src/components/Check.vue b/apps/workflowengine/src/components/Check.vue
index c15907852e8..cfd0f034adf 100644
--- a/apps/workflowengine/src/components/Check.vue
+++ b/apps/workflowengine/src/components/Check.vue
@@ -121,6 +121,7 @@ export default {
 			this.deleteVisible = false
 		},
 		validate() {
+			this.valid = true
 			if (this.currentOption && this.currentOption.validate) {
 				this.valid = !!this.currentOption.validate(this.check)
 			}
-- 
cgit v1.2.3

