From d1a81a0225c326c91ee2e09167055d6f98924560 Mon Sep 17 00:00:00 2001
From: Julius Härtl <jus@bitgrid.net>
Date: Thu, 9 Jan 2020 08:45:41 +0100
Subject: Fallback to proper default values
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Signed-off-by: Julius Härtl <jus@bitgrid.net>
---
 apps/workflowengine/src/components/Rule.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'apps/workflowengine/src/components/Rule.vue')

diff --git a/apps/workflowengine/src/components/Rule.vue b/apps/workflowengine/src/components/Rule.vue
index 7796180be6f..c6e23a8f180 100644
--- a/apps/workflowengine/src/components/Rule.vue
+++ b/apps/workflowengine/src/components/Rule.vue
@@ -19,7 +19,7 @@
 					type="button"
 					class="check--add"
 					value="Add a new filter"
-					@click="rule.checks.push({class: null, operator: null, value: null})">
+					@click="rule.checks.push({class: null, operator: null, value: ''})">
 			</p>
 		</div>
 		<div class="flow-icon icon-confirm" />
-- 
cgit v1.2.3

