From b6f0a55c06cabbf1e9f0a1ac6d9dc5840a670ad9 Mon Sep 17 00:00:00 2001
From: Pierre <pierre.guillot@sonarsource.com>
Date: Tue, 2 Jan 2024 16:54:48 +0100
Subject: NO-JIRA Update license headers to 2024

---
 .../design-system/src/components/__tests__/CoverageIndicator-test.tsx  | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'server/sonar-web/design-system/src/components/__tests__/CoverageIndicator-test.tsx')

diff --git a/server/sonar-web/design-system/src/components/__tests__/CoverageIndicator-test.tsx b/server/sonar-web/design-system/src/components/__tests__/CoverageIndicator-test.tsx
index 1b14752eac6..df178e6336f 100644
--- a/server/sonar-web/design-system/src/components/__tests__/CoverageIndicator-test.tsx
+++ b/server/sonar-web/design-system/src/components/__tests__/CoverageIndicator-test.tsx
@@ -1,6 +1,6 @@
 /*
  * SonarQube
- * Copyright (C) 2009-2023 SonarSource SA
+ * Copyright (C) 2009-2024 SonarSource SA
  * mailto:info AT sonarsource DOT com
  *
  * This program is free software; you can redistribute it and/or
@@ -17,7 +17,6 @@
  * along with this program; if not, write to the Free Software Foundation,
  * Inc., 51 Franklin Street, Fifth Floor, Boston, MA  02110-1301, USA.
  */
-
 import { screen } from '@testing-library/react';
 import { render } from '../../helpers/testUtils';
 import { FCProps } from '../../types/misc';
-- 
cgit v1.2.3

