From 4a2ab9017b96d97aa2edab33913c42c9b435fb8b Mon Sep 17 00:00:00 2001
From: elmot <elmot@vaadin.com>
Date: Tue, 29 Dec 2015 17:47:51 +0200
Subject: Fixed language mistakes

Change-Id: I838fccb573166791bf7fdcd9bc292dd9a4ae810c
---
 documentation/application/application-errors.asciidoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'documentation/application/application-errors.asciidoc')

diff --git a/documentation/application/application-errors.asciidoc b/documentation/application/application-errors.asciidoc
index f1406191bb..efadaa414b 100644
--- a/documentation/application/application-errors.asciidoc
+++ b/documentation/application/application-errors.asciidoc
@@ -36,8 +36,8 @@ image::img/errorindicator-example2.png[scaledwidth=40%]
 
 If the connection to the server is lost, Vaadin application shows a "lost connection" notification
 and tries to restore the connection. After several retries, an error message is shown.
-You can customize the messages, timeouts and the number of reconnect attempts using [classname]#ReconnectDialogConfiguration#
-class. Use [methodname]#getReconnectDialogConfiguration# of your [classname]#UI# object.
+You can customize the messages, timeouts, and the number of reconnect attempts in the [classname]#ReconnectDialogConfiguration#
+object, which you can access from your [classname]#UI# with [methodname]#getReconnectDialogConfiguration()#.
 
 ifdef::web[]
 [[application.errors.systemmessages]]
-- 
cgit v1.2.3

