From 0b7457325200162961cae52e7d871db928dc3cd9 Mon Sep 17 00:00:00 2001
From: Zhe Sun <31067185+ZheSun88@users.noreply.github.com>
Date: Thu, 23 May 2019 09:43:31 +0300
Subject: Update broken docs syntax in github (#11596)

* Add delay to the unstable test

* Add delay for unstable tests

* Update broken docs syntax in github

* Merge branch 'master' into ZheSun88-patch-1

* Update doc reference syntax

* Merge branch 'ZheSun88-patch-1' of github.com:vaadin/framework into ZheSun88-patch-1

# Conflicts:
#	documentation/components/components-overview.asciidoc

* Merge branch 'master' into ZheSun88-patch-1

* use .asciidoc

* Merge remote-tracking branch 'origin/ZheSun88-patch-1' into ZheSun88-patch-1

* use .asciidoc

* Merge branch 'master' into ZheSun88-patch-1
---
 documentation/application/application-notifications.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'documentation/application/application-notifications.asciidoc')

diff --git a/documentation/application/application-notifications.asciidoc b/documentation/application/application-notifications.asciidoc
index 8e0a08e075..3721aeb099 100644
--- a/documentation/application/application-notifications.asciidoc
+++ b/documentation/application/application-notifications.asciidoc
@@ -52,7 +52,7 @@ is disabled by default, but can be enabled with
 markup in the caption and description of a notification. If it is in any way
 possible to get the notification content from user input, you should either
 disallow HTML or sanitize the content carefully, as noted in
-<<dummy/../../../framework/advanced/advanced-security#advanced.security.sanitizing,"Sanitizing
+<<../advanced/advanced-security#advanced.security.sanitizing,"Sanitizing
 User Input to Prevent Cross-Site Scripting">>.
 
 [[figure.notification.example2]]
-- 
cgit v1.2.3

