From cce70a449c1d41d76c54a987fe80e20b700bea9b Mon Sep 17 00:00:00 2001
From: Pekka Hyvönen <pekka@vaadin.com>
Date: Tue, 3 Jan 2017 10:24:58 +0200
Subject: Update remaining of application documentation for 8 (#8124)

Fixes vaadin/framework8-issues#580
---
 documentation/application/application-notifications.asciidoc | 2 --
 1 file changed, 2 deletions(-)

(limited to 'documentation/application/application-notifications.asciidoc')

diff --git a/documentation/application/application-notifications.asciidoc b/documentation/application/application-notifications.asciidoc
index 920bcbc6f7..d19751d73f 100644
--- a/documentation/application/application-notifications.asciidoc
+++ b/documentation/application/application-notifications.asciidoc
@@ -102,7 +102,6 @@ seconds by default. The user can continue to interact with the application
 normally while the tray notification is displayed.
 
 
-ifdef::web[]
 [[application.notifications.customization]]
 == Customizing Notifications
 
@@ -140,7 +139,6 @@ also prevents interaction with other parts of the application window, which is
 the default behaviour for error notifications. It does not, however, add a close
 box that the error notification has.
 
-endif::web[]
 
 [[application.notifications.css]]
 == Styling with CSS
-- 
cgit v1.2.3

