From 124ed6d87ecfdfbb1d88ffdf615f5c8cc7f0e0b1 Mon Sep 17 00:00:00 2001
From: tmattsso <thomas@vaadin.com>
Date: Tue, 20 Nov 2018 13:03:22 +0200
Subject: Removes wrong suggestion from checkbox documentation (#11324)

---
 documentation/components/components-checkbox.asciidoc | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'documentation/components/components-checkbox.asciidoc')

diff --git a/documentation/components/components-checkbox.asciidoc b/documentation/components/components-checkbox.asciidoc
index 4e1205be8f..67e3ad6108 100644
--- a/documentation/components/components-checkbox.asciidoc
+++ b/documentation/components/components-checkbox.asciidoc
@@ -55,5 +55,4 @@ image::img/checkbox-example1.png[width=35%, scaledwidth=50%]
 
 The top-level element of a [classname]#CheckBox# has the
 [literal]#++v-checkbox++# style. It contains two sub-elements: the actual check
-box [literal]#++input++# element and the [literal]#++label++# element. If you
-want to have the label on the left, you can change the positions with "[literal]#++direction: rtl++#" for the top element.
+box [literal]#++input++# element and the [literal]#++label++# element.
-- 
cgit v1.2.3

