From ae8b143761fd59160d40e5bab01966cc4455475d Mon Sep 17 00:00:00 2001
From: berndhopp <bernd@vaadin.com>
Date: Fri, 22 Jan 2016 15:36:47 +0100
Subject: fix links in to sampler

Change-Id: I9ec68675b211b6ed8b11d44f4857980c1d7643e8
---
 documentation/components/components-checkbox.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'documentation/components/components-checkbox.asciidoc')

diff --git a/documentation/components/components-checkbox.asciidoc b/documentation/components/components-checkbox.asciidoc
index 95a60cd5fa..4e84010b6a 100644
--- a/documentation/components/components-checkbox.asciidoc
+++ b/documentation/components/components-checkbox.asciidoc
@@ -9,7 +9,7 @@ layout: page
 
 ifdef::web[]
 [.sampler]
-image:{live-demo-image}[alt="Live Demo", link="http://demo.vaadin.com/sampler/#ui/data-input/other/check-box]
+image:{live-demo-image}[alt="Live Demo", link="http://demo.vaadin.com/sampler/#ui/data-input/other/check-box"]
 endif::web[]
 
 [classname]#CheckBox# is a two-state selection component that can be either
-- 
cgit v1.2.3

