From 0b7457325200162961cae52e7d871db928dc3cd9 Mon Sep 17 00:00:00 2001
From: Zhe Sun <31067185+ZheSun88@users.noreply.github.com>
Date: Thu, 23 May 2019 09:43:31 +0300
Subject: Update broken docs syntax in github (#11596)

* Add delay to the unstable test

* Add delay for unstable tests

* Update broken docs syntax in github

* Merge branch 'master' into ZheSun88-patch-1

* Update doc reference syntax

* Merge branch 'ZheSun88-patch-1' of github.com:vaadin/framework into ZheSun88-patch-1

# Conflicts:
#	documentation/components/components-overview.asciidoc

* Merge branch 'master' into ZheSun88-patch-1

* use .asciidoc

* Merge remote-tracking branch 'origin/ZheSun88-patch-1' into ZheSun88-patch-1

* use .asciidoc

* Merge branch 'master' into ZheSun88-patch-1
---
 documentation/components/components-progressbar.asciidoc | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'documentation/components/components-progressbar.asciidoc')

diff --git a/documentation/components/components-progressbar.asciidoc b/documentation/components/components-progressbar.asciidoc
index 54940799b3..f0d5051778 100644
--- a/documentation/components/components-progressbar.asciidoc
+++ b/documentation/components/components-progressbar.asciidoc
@@ -26,11 +26,11 @@ When the position of a progress bar is done in a background thread, the change
 is not shown in the browser immediately. You need to use either polling or
 server push to update the browser. You can enable polling with
 [methodname]#setPollInterval()# in the current UI instance. See
-<<dummy/../../../framework/advanced/advanced-push#advanced.push,"Server Push">>
+<<../advanced/advanced-push#advanced.push,"Server Push">>
 for instructions about using server push. Whichever method you use to update the
 UI, it is important to lock the user session by modifying the progress bar value
 inside [methodname]#access()# call, as described in
-<<dummy/../../../framework/advanced/advanced-push#advanced.push.running,"Accessing UI from Another Thread">>.
+<<../advanced/advanced-push#advanced.push.running,"Accessing UI from Another Thread">>.
 
 [source, java]
 ----
@@ -70,7 +70,7 @@ including the progress bar, can be updated either with polling or by using
 server push. When doing so, you must ensure thread-safety, most easily by
 updating the UI inside a [methodname]#UI.access()# call in a
 [interfacename]#Runnable#, as described in
-<<dummy/../../../framework/advanced/advanced-push#advanced.push.running,"Accessing
+<<../advanced/advanced-push#advanced.push.running,"Accessing
 UI from Another Thread">>.
 
 
-- 
cgit v1.2.3

