From 93767cf76b2fb14c65b758066c67fc8b48cc2eeb Mon Sep 17 00:00:00 2001
From: Marko Gronroos <magi@vaadin.com>
Date: Fri, 20 May 2016 14:44:42 +0300
Subject: Scaled images for print edition and fixed errors up to the beginning
 of layouts chapter (#19835). Also major revision of Tree, CustomField, and
 layouts overview.

Change-Id: I19f5e9511b83f953ce4707f324d81c2821ebb69d
---
 documentation/installing/installing-idea.asciidoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'documentation/installing/installing-idea.asciidoc')

diff --git a/documentation/installing/installing-idea.asciidoc b/documentation/installing/installing-idea.asciidoc
index 95779dab55..3533a3feb1 100644
--- a/documentation/installing/installing-idea.asciidoc
+++ b/documentation/installing/installing-idea.asciidoc
@@ -43,12 +43,12 @@ A WebSocket-enabled server, such as Glassfish or TomEE, is required for server p
 
 . In the Tomcat Server dialog, specify the home directory for the server.
 +
-image::img/idea-server-1.png[]
+image::img/idea-server-1.png[scaledwidth=80%]
 +
 Click [guibutton]#OK#.
 
 . Review the application server settings page to check that it is OK.
 +
-image::img/idea-server-2.png[]
+image::img/idea-server-2.png[scaledwidth=100%]
 +
 Then, click [guibutton]#OK#.
-- 
cgit v1.2.3

