From 4a2ab9017b96d97aa2edab33913c42c9b435fb8b Mon Sep 17 00:00:00 2001
From: elmot <elmot@vaadin.com>
Date: Tue, 29 Dec 2015 17:47:51 +0200
Subject: Fixed language mistakes

Change-Id: I838fccb573166791bf7fdcd9bc292dd9a4ae810c
---
 documentation/layout/layout-sub-window.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'documentation/layout/layout-sub-window.asciidoc')

diff --git a/documentation/layout/layout-sub-window.asciidoc b/documentation/layout/layout-sub-window.asciidoc
index 972cb00ae9..f8d8fbef17 100644
--- a/documentation/layout/layout-sub-window.asciidoc
+++ b/documentation/layout/layout-sub-window.asciidoc
@@ -71,7 +71,7 @@ corner of the window. The button is controlled by the __closable__ property, so
 you can disable it with [methodname]#setClosable(false)#. You can also use keyboard
 shortcuts for closing a sub-window.  You can manage the shortcuts with the [methodname]#addCloseShortcut()#,
 [methodname]#removeCloseShortcut()#, [methodname]#removeAllCloseShortcuts()#,
-[methodname]#hasCloseShortcut()# and [methodname]#getCloseShortcuts()# methods.
+[methodname]#hasCloseShortcut()#, and [methodname]#getCloseShortcuts()# methods.
 
 You close a sub-window also programmatically by calling the
 [methodname]#close()# for the sub-window, typically in a click listener for an
-- 
cgit v1.2.3

